\input hyperbasics

This page just has a \hyperdef\targetone{test}{1}{target}.

This page has a \hyperref\targetone{reference to this page}.

This page has a \hyperref\targettwo{reference to page two}.

This page has a \hyperref\targetthree{reference to page three}.

\vfill\eject

This page has a \hyperref\targetone{reference to page one}.

This page just has a \hyperdef\targettwo{test}{2}{target}.

This page has a \hyperref\targettwo{reference to this page}.

This page has a \hyperref\targetthree{reference to page three}.

\vfill\eject

This page has a \hyperref\targetone{reference to page one}.

This page has a \hyperref\targettwo{reference to page two}.

This page just has a \hyperdef\targetthree{test}{3}{target}.

This page has a \hyperref\targetthree{reference to this page}.

\vfill\eject

This page has a \hyperref\targetone{reference to page one}.

This page has a \hyperref\targettwo{reference to page two}.

This page has a \hyperref\targetthree{reference to page three}.

\end
